\begin{thebibliography}{100}

\bibitem{RSM:Kil87}
D.~Kilpatrick and S.J. Walker.
\newblock A validation of derived epicardial potential distributions by
  prediction of the coronary artery involved in acute myocardial infarction in
  humans.
\newblock {\em Circ.}, 76(6):1282--9, Dec 1987.

\bibitem{RSM:Mac95}
R.S. MacLeod, R.M. Miller, M.J. Gardner, and B.M. Hor\'{a}\v{c}ek.
\newblock Application of an electrocardiographic inverse solution to localize
  myocardial ischemia during percutaneous transluminal coronary angioplasty.
\newblock {\em J. Cardiovasc. Electrophysiol.}, 6:2--18, 1995.

\bibitem{RSM:Ost97}
H.S. Oster, B.~Taccardi, R.L. Lux, P.R. Ershler, and Y.~Rudy.
\newblock Noninvasive electrocardiographic imaging: {R}econstruction of
  epicardial potentials, electrograms, and isochrones and localization of
  single and multiple electrocardiac events.
\newblock {\em Circ.}, 96(3):1012--1024, 1997.

\bibitem{RSM:Kle97}
R.N. Klepfer, C.R. Johnson, and R.S. MacLeod.
\newblock The effects of inhomogeneities and anisotropies on
  electrocardiographic fields: {A} three-dimensional finite element study.
\newblock {\em IEEE Trans Biomed. Eng.}, 44(8):706--719, 1997.

\bibitem{RSM:Bro74}
D.A. Brody, F.H. Terry, and R.E. Ideker.
\newblock Eccentric dipole in a spherical medium: generalized expression for
  surface potentials.
\newblock {\em IEEE Trans Biomed. Eng.}, 1974.

\bibitem{RSM:Rud79}
Y.~Rudy and R.~Plonsey.
\newblock The eccentric spheres model as the basis for a study of the role of
  geometry and inhomogeneities in electrocardiography.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-26:392--399, 1979.

\bibitem{RSM:Bay62}
R.H. Bayley and P.M. Berry.
\newblock The electrical field produced by the eccentric current dipole in the
  nonhomogeneous conductor.
\newblock {\em Am. Heart J.}, 63, 1962.

\bibitem{RSM:Bay64}
R.H. Bayley and P.M. Berry.
\newblock The arbitrary electromotive double layer in the eccentric ``heart''
  of the nonhomogeneous circular lamina.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-11, 1964.

\bibitem{RSM:Bay69}
R.H. Bayley, J.M. Kalbfleisch, and P.M. Berry.
\newblock Changes in the body's {QRS} surface potentials produced by
  alterations in certain compartments of the nonhomogeneous conducting model.
\newblock {\em Am. Heart J.}, 77, 1969.

\bibitem{RSM:Rud79b}
Y.~Rudy and R.~Plonsey.
\newblock The effects of variations in conductivity and geometrical parameters
  on the electrocardiogram, using an eccentric spheres model.
\newblock {\em Circ. Res.}, 44(1):104--111, 1979.

\bibitem{RSM:Rud80}
Y.~Rudy and R.~Plonsey.
\newblock A comparison of volume conductor and source geometry effects on body
  surface and epicardial potentials.
\newblock {\em Circ. Res.}, 46:283--291, 1980.

\bibitem{RSM:Thr97}
R.D. Throne, L.G. Olson, T.J. Hrabik, and J.R. Windle.
\newblock Generalized eigensystem techniques for the inverse problem of
  electrocardiography applied to a realistic heart-torso geometry.
\newblock {\em IEEE Trans Biomed. Eng.}, 44(6):447, 1997.

\bibitem{RSM:Iak91}
I.~Iakovidis and R.M. Gulrajani.
\newblock Regularization of the inverse epicardial solution using linearly
  constrained optimization.
\newblock In {\em Proceedings of the IEEE Engineering in Medicine and Biology
  Society 13th Annual International Conference}, pages 698--699. IEEE Press,
  1991.

\bibitem{RSM:Thr94}
R.~Throne and L.~Olsen.
\newblock A generalized eigensystem aproach to the inverse problem of
  electrocardiography.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-41:592--600, 1994.

\bibitem{RSM:Thr95}
R.~Throne and L.~Olsen.
\newblock The effect of errors in assumed conductivities and geometry on
  numerical solutions to the inverse problem of electrocardiography.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-42, 1995.

\bibitem{RSM:He98}
S.~He.
\newblock Frequency series expansion of an explicit solution for a dipole
  inside a conducting sphere at low frequencies.
\newblock {\em IEEE Trans Biomed. Eng.}, 45(10):1249--1258, 1998.

\bibitem{RSM:Bar66}
R.C. Barr, T.C. Pilkington, J.P. Boineau, and M.S. Spach.
\newblock Determining surface potentials from current dipoles, with application
  to electrocardiography.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-13:88--92, 1966.

\bibitem{RSM:Mac90}
R.S. MacLeod.
\newblock {\em Percutaneous Transluminal Coronary Angioplasty as a Model of
  Cardiac Ischemia: Clinical and Modelling Studies}.
\newblock PhD thesis, Dalhousie University, Halifax, N.S., Canada, 1990.

\bibitem{RSM:Dur70}
D.~Durrer, R.T. van Dam, G.E. Freud, M.J. Janse, F.L. Meijler, and R.C.
  Arzbaecher.
\newblock Total excitation of the isolated human heart.
\newblock {\em Circ.}, 41:899--912, 1970.

\bibitem{RSM:Sha94b}
A.V. Shahidi, P.~Savard, and R.~Nadeau.
\newblock Forward and inverse problems of electrocardiography: {M}odeling and
  recovery of epicardial potentials in humans.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-41(3):249--256, 1994.

\bibitem{RSM:Mes90}
B.J. Messinger-Rapport and Y.~Rudy.
\newblock Noninvasive recovery of epicardial potentials in a realistic
  heart-torso geometry.
\newblock {\em Circ. Res.}, 66, 4:1023--1039, 1990.

\bibitem{RSM:Joh97}
C.R. Johnson and R.S. MacLeod.
\newblock Adaptive local regularization methods for the inverse {ECG} problem.
\newblock {\em Progress in Biophysics and Biochemistry}, 69(2/3), 1998.

\bibitem{RSM:Ahm98}
G.F. Ahmad, D.~H Brooks, and R.S. MacLeod.
\newblock An admissible solution approach to inverse electrocardiography.
\newblock {\em Annal. Biomed. Eng.}, 26:278--292, 1998.

\bibitem{RSM:Bro99}
D.H. Brooks, G.F. Ahmad, R.S. MacLeod, and G.M. Maratos.
\newblock Inverse electrocardiography by simultaneous imposition of multiple
  constraints.
\newblock {\em IEEE Trans Biomed. Eng.}, 46(1):3--18, 1999.

\bibitem{RSM:Bur2000}
J.E. Burns, B.~Taccardi, R.S. MacLeod, and Y.~Rudy.
\newblock Noninvasive electrocardiographic imaging of electrophysiologically
  abnormal substrates in infarcted hearts: {A} model study.
\newblock {\em Circ.}, (in press).

\bibitem{RSM:Hor83}
B.M. Hor\'{a}\v{c}ek, R.G. de~Boer, J.L. Leon, and T.J. Montague.
\newblock Human epicardial potential distributions computed from
  body-surface-available data.
\newblock In K.~Yamada, K.~Harumi, and T.~Musha, editors, {\em Advances in Body
  Surface Potential Mapping}, pages 47--54. University of Nagoya Press, Nagoya,
  Japan, 1983.

\bibitem{RSM:Hui89}
G.J. Huiskamp and A.~van Oosterom.
\newblock The depolarization sequence of the human heart surface computed from
  measured body surface potentials.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-35:1047--1059, 1989.

\bibitem{RSM:Hui89b}
G.J. Huiskamp and A.~van Oosterom.
\newblock Tailored versus standard geometry in the inverse problem of
  electrocardiography.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-36:827--835, 1989.

\bibitem{RSM:Oos89b}
A.~van Oosterom and G.J. Huiskamp.
\newblock The effect of torso inhomogeneities on body surface potentials
  quantified using ``tailored'' geometry.
\newblock {\em J. Electrocardiol.}, 22:53--72, 1989.

\bibitem{RSM:Oos97b}
A.~van Oosterom.
\newblock Incorporation of the spatial covariance in the inverse problem.
\newblock {\em Biomed. Technik}, 42(supp.):43--52, 1997.

\bibitem{RSM:Bro97b}
D.H. Brooks and R.S. MacLeod.
\newblock Electrical imaging of the heart: Electrophysical underpinnings and
  signal processing opportunities.
\newblock {\em IEEE Sig. Proc. Mag.}, 14(1):24--42, 1997.

\bibitem{RSM:Hre96}
R.~Hren.
\newblock {\em A Realistic Model of the Human Ventricular Myocardium:
  Application to the Study of Ectopic Activation}.
\newblock PhD thesis, Dalhousie University, Halifax, Nova Scotia, 1996.

\bibitem{RSM:Hre96b}
R.~Hren, X.~Zhang, and G.~Stroink.
\newblock Comparison between electrocardiographic and magnetocardiographic
  inverse solutions using the boundary element method.
\newblock {\em Med. \& Biol. Eng. \& Comp.}, 34(2):110, 1996.

\bibitem{RSM:Hre97}
R.~Hren, R.S. MacLeod, G.~Stroink, and B.M. Hor\'{a}\v{c}ek.
\newblock Assessment of spatial resolution of body surface potentials maps in
  localizing ventricular tachycardia foci.
\newblock {\em Biomed. Technik}, 42(suppl.):41--44, 1997.

\bibitem{RSM:Moe64}
G.K. Moe, W.C. Rheinboldt, and J.A. Abildskov.
\newblock A computer model of fibrillation.
\newblock {\em Am. Heart J.}, 67:200--220, 1964.

\bibitem{RSM:Mit68}
M.~Okajima, T.~Fujinaa, T.~Kobayashi, and K.~Yamada.
\newblock Computer simulation of the propagation process in excitation of the
  ventricles.
\newblock {\em Circ. Res.}, 23:203--211, 1968.

\bibitem{RSM:Abi90}
J.A. Abildskov.
\newblock Mechanism of the vulnerable period in a model of cardiac
  fibrillation.
\newblock {\em J. Cardiovasc. Electrophysiol.}, 1:303--308, 1990.

\bibitem{RSM:Res90}
M.~Restivo, W.~Craelius, W.B. Gough, and N.~El-Sherif.
\newblock A logical state model of reentrant ventricular activation.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-37:344--353, April 1990.

\bibitem{RSM:Bai90}
A.H. Bailie, R.H. Mithchell, and J.~McCAnderson.
\newblock A computer model of re-entry in cardiac tissue.
\newblock {\em Comp. in Biol. \& Med.}, pages 47--54, 1990.

\bibitem{RSM:Abi91a}
J.A. Abildskov and R.L. Lux.
\newblock The mechanism of simulated {Torsade de Pointes} in a computer model
  of propagated excitation.
\newblock {\em J. Cardiovasc. Electrophysiol.}, 2:224--237, 1991.

\bibitem{RSM:Leo91a}
L.J. Leon and B.M. Hor\'{a}\v{c}ek.
\newblock Computer model of excitation and recovery in the anisotropic
  myocardium: {I} {R}ectangular and cubic arrays of excitable elements.
\newblock {\em J. Electrocardiol.}, 24:1--15, 1991.

\bibitem{RSM:Leo91b}
L.J. Leon and B.M. Hor\'{a}\v{c}ek.
\newblock Computer model of excitation and recovery in the anisotropic
  myocardium: {II} {E}xcitation in the simplified left ventricle.
\newblock {\em J. Electrocardiol.}, 24:17--31, 1991.

\bibitem{RSM:Leo91c}
L.J. Leon and B.M. Hor\'{a}\v{c}ek.
\newblock Computer model of excitation and recovery in the anisotropic
  myocardium: {III} {A}rrhythmogenic conditions in the simplified left
  ventricle.
\newblock {\em J. Electrocardiol.}, 24:33--41, 1991.

\bibitem{RSM:Gro92}
H.R. Grogin, M.L. Stanley, S.~Eisenberg, B.M. Hor\'{a}\v{c}ek, and M.D. Lesh.
\newblock Body surface mapping for localization of accessory pathways in {WPW}
  syndrome.
\newblock In {\em IEEE Computers in Cardiology}, page 255. IEEE Computer
  Society, 1992.

\bibitem{RSM:Gha93}
P.B. Gharpure and C.R. Johnson.
\newblock A 3-dimensional cellular automation model of the heart.
\newblock In {\em Proceedings of the IEEE Engineering in Medicine and Biology
  Society 15th Annual International Conference}, pages 752--753. IEEE Press,
  1993.

\bibitem{RSM:Hre98b}
R.~Hren, J.~Nenonen, and B.M. Horacek.
\newblock Simulated epicardial potential maps during paced activation reflect
  myocardial fibrous structure.
\newblock {\em Annal. Biomed. Eng.}, 26(6):1022, 1998.

\bibitem{RSM:Hre98}
R.~Hren and B.B. Punske.
\newblock A comparison of simulated {QRS} isointegral maps resulting from
  pacing at adjacent sites: Implications for the spatial resolution of pace
  mapping using body surface potentials.
\newblock {\em J. Electrocardiol.}, 31 (suppl.):135, 1998.

\bibitem{RSM:Hre99}
R.~Hren, B.B. Punske, and G.~Stroink.
\newblock Assessment of spatial resolution of cardiac pace mapping when using
  body surface potentials.
\newblock {\em Med. \& Biol. Eng. \& Comp.}, 37(4):477, 1999.

\bibitem{RSM:Bur47}
H.C. Burger and J.B. van Milaan.
\newblock Heart-vector and leads. {P}art {II}.
\newblock {\em Br. Heart J.}, 9:154--60, 1947.

\bibitem{RSM:Bur48}
H.C. Burger and J.B. van Milaan.
\newblock Heart-vector and leads. {P}art {III}: Geometrical representation.
\newblock {\em Br. Heart J.}, 10:229--33, 1948.

\bibitem{RSM:Hor89}
B.M. Hor\'{a}\v{c}ek.
\newblock Lead theory.
\newblock In P.W. Macfarlane and T.D.~Veitch Lawrie, editors, {\em
  Comprehensive Electrocardiology}, pages 291--314. Pergamon Press, Oxford,
  England, 1989.
\newblock Volume 1.

\bibitem{RSM:Gra67}
J.~Grayzel and F.~Lizzi.
\newblock The combined influence of inhomogeneties and dipole location.
\newblock {\em Am. Heart J.}, 74:503--512, 1967.

\bibitem{RSM:Gra69}
J.~Grayzel and F.~Lizzi.
\newblock The performance of {VCG} leads in homogenous and heterogenous torsos.
\newblock {\em J. Electrocardiol.}, 2(1):17--26, 1969.

\bibitem{RSM:Nag70}
Y.~Nagata.
\newblock The electrocardiographic leads for telemetering as evaluated from
  view point of the transfer impedance vector.
\newblock {\em Jap. Heart J.}, 11(2):183--194, 1970.

\bibitem{RSM:Nag70b}
Y.~Nagata.
\newblock The influence of the inhomogeneities of electrical conductance within
  the torso on the electrocardiogram as evaluated from the view point of the
  transfer impedance vector.
\newblock {\em Jap. Heart J.}, 11(5):489--505, 1970.

\bibitem{RSM:DeA70}
L.~De Ambroggi and B.~Taccardi.
\newblock Current and potential fields generated by two dipoles.
\newblock {\em Circ. Res.}, 27:910--911, 1970.

\bibitem{RSM:Mir79}
D.M. Mirvis.
\newblock Electrocardiographic {QRS} changes induced by acute coronary ligation
  in the isolated rabbit heart.
\newblock {\em J. Electrocardiol.}, 12:141--150, 1979.

\bibitem{RSM:Ide75}
R.E. Ideker, J.P. Bandura, R.A. Larsen, J.W. Cox, F.W. Keller, and D.A. Brody.
\newblock Localization of heart vectors produced by epicardial burns and
  ectopic stimuli.
\newblock {\em Circ. Res.}, 36:105--112, 1975.

\bibitem{RSM:Mir77}
D.M Mirvis, F.W. Keller, R.E. Ideker, J.W. Cox, R.F. Dowdie, and D.G.
  Zettergren.
\newblock Detection and localization of a multple epicardial electrical
  generator by a two dipole ranging technique.
\newblock {\em Circ. Res.}, 41:551, 1977.

\bibitem{RSM:Mir78b}
D.M. Mirvis, F.W. Keller, and J.W. Cox.
\newblock Experimenal comparison of four inverse electrocardiographic
  constructs in the isolated rabbit heart.
\newblock {\em J. Electrocardiol.}, 11(1):57--65, 1978.

\bibitem{RSM:Bar76}
R.C. Barr and M.S. Spach.
\newblock Inverse solutions directly in terms of potentials.
\newblock In C.V. Nelson and D.B. Geselowitz, editors, {\em The Theoretical
  Basis of Electrocardiography}, pages 294--304. Clarendon Press, Oxford, 1976.

\bibitem{RSM:Bar77}
R.C. Barr, M.~Ramsey, and M.S. Spach.
\newblock Relating epicardial to body surface potential distributions by means
  of transfer coefficients based on geometry measurements.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-24:1--11, 1977.

\bibitem{RSM:Bar78}
R.C. Barr and M.S. Spach.
\newblock A comparison of measured epicardial potentials with epicardial
  potentials computed from body surface measurements in the intact dog.
\newblock {\em Adv. Cardiol.}, 21:19--22, 1978.

\bibitem{RSM:Pil85}
T.C. Pilkington, M.N. Morrow, and P.C. Stanley.
\newblock A comparison of finite element and integral equation formulations for
  the calculation of electrocardiographic potentials.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-32:166--173, 1985.

\bibitem{RSM:Pil87}
T.C. Pilkington, M.N. Morrow, and P.C. Stanley.
\newblock A comparison of finite element and integral equation formulations for
  the calculation of electrocardiographic potentials - {II}.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-34:258--260, 1987.

\bibitem{RSM:Che99}
L.K. Chengand and A.J. Pullan.
\newblock Towards non-invasive electrical heart imaging.
\newblock In {\em Proceedings of The First JointBMES/EMBS Conference}, page
  302. IEEE EMBS and BMES, IEEE Press, 1999.

\bibitem{RSM:Col79}
P.~Colli Franzone, L.~Guerri, B.~Taccardi, and C.~Viganotti.
\newblock The direct and inverse problems in electrocardiology. {N}umerical
  aspects of some regularization methods and applications to data collected in
  isolated dog heart experiments.
\newblock {\em Lab. Anal. Numerica C.N.R.}, Pub. N:222, 1979.

\bibitem{RSM:Col79b}
P.~Colli Franzone, G.~Gassaniga, L.~Guerri, B.~Taccardi, and C.~Viganotti.
\newblock Accuracy evaluation in direct and inverse electrocardiology.
\newblock In P.W. Macfarlane, editor, {\em Progress in Electrocardiography},
  pages 83--87. Pitman Medical, 1979.

\bibitem{RSM:Col85}
P.~Colli Franzone, L.~Guerri, B.~Taccardi, and C.~Viganotti.
\newblock Finite element approximation of regularized solution of the the
  inverse potential problem of electrocardiography and application to
  experimental data.
\newblock {\em Calcolo}, 22:91, 1985.

\bibitem{RSM:Col85b}
P.~Colli Franzone, L.~Guerri, S.~Tentonia, C.~Viganotti, S.~Spaggiari, and
  B.~Taccardi.
\newblock A numerical procedure for solving the inverse problem of
  electrocardiography. {A}nalysis of the time-space accuracy from {\em in
  vitro\/} experimental data.
\newblock {\em Math. Biosci.}, 77:353, 1985.

\bibitem{RSM:Sou89}
B.~Soucy, R.M. Gulrajani, and R.~Cardinal.
\newblock Inverse epicardial potential solutions with an isolated heart
  preparation.
\newblock In {\em Proceedings of the IEEE Engineering in Medicine and Biology
  Society 11th Annual International Conference}, pages 193--194. IEEE Press,
  1989.

\bibitem{RSM:Ost90}
H.~Oster and Y.~Rudy.
\newblock The use of temporal information in the regularization of the inverse
  problem of electrocardiography.
\newblock In {\em Proceedings of the IEEE Engineering in Medicine and Biology
  Society 12th Annual International Conference}, pages 599--600. IEEE Press,
  1990.

\bibitem{RSM:Rud92}
Y.~Rudy and H.~Oster.
\newblock The electrocardiographic inverse problem.
\newblock {\em Crit. Rev. Biomed. Eng.}, 20:22--45, 1992.

\bibitem{RSM:Mac94f}
R.S. MacLeod, B.~Taccardi, and R.L. Lux.
\newblock The influence of torso inhomogeneities on epicardial potentials.
\newblock In {\em IEEE Computers in Cardiology}, pages 793--796. IEEE Computer
  Society, 1994.

\bibitem{RSM:Bro94b}
D.H. Brooks and R.S. MacLeod.
\newblock Imaging the electrical activity of the heart: {D}irect and inverse
  approaches.
\newblock In {\em IEEE International Conference on Image Processing}, pages
  548--552. IEEE Computer Society, 1994.

\bibitem{RSM:Bro94d}
D.H. Brooks, H.~On, and R.S. MacLeod.
\newblock Multidimensional multiresolution analysis of array {ECG} signals
  during {PTCA} procedures.
\newblock In {\em IEEE Symposium on Time-Frequency and Time-Scale}, pages
  552--555. IEEE Computer Society, 1994.

\bibitem{RSM:Bro94e}
D.H. Brooks, G.~Ahmad, and R.S. MacLeod.
\newblock Multiply constrained inverse electrocardiology: {C}ombining temporal,
  multiple spatial, and iterative regularization.
\newblock In {\em Proceedings of the IEEE Engineering in Medicine and Biology
  Society 16th Annual International Conference}, pages 137--138. IEEE Computer
  Society, 1994.

\bibitem{RSM:Mac95d}
R.S. MacLeod, B.~Taccardi, and R.L. Lux.
\newblock Electrocardiographic mapping in a realistic torso tank preparation.
\newblock In {\em Proceedings of the IEEE Engineering in Medicine and Biology
  Society 17th Annual International Conference}, pages 245--246. IEEE Press,
  1995.

\bibitem{RSM:Ost97b}
H.S. Oster and Y.~Rudy.
\newblock Regional regularization of the electrocardiographic inverse problem:
  {A} model study using spherical geometry.
\newblock {\em IEEE Trans Biomed. Eng.}, 44(2):188--199, 1997.

\bibitem{RSM:Kho92}
D.S. Khoury and Y.~Rudy.
\newblock A model study of volume conductor effects on endocardial and
  intracavitary potentials.
\newblock {\em Circ. Res.}, 71(3):511--525, 1992.

\bibitem{RSM:Kho92b}
D.S. Khoury and Y.~Rudy.
\newblock Reconstruction of endocardial potentials from intracavitary probe
  potentials: a model study.
\newblock In {\em IEEE Computers in Cardiology}, pages 9--12, 1992.

\bibitem{RSM:Lui97}
Z.W. Lui, P.R. Ershler, B.~Taccardi, R.L. Lux, D.S. Khoury, and Y.~Rudy.
\newblock Noncontact endocardial mapping: Reconstruction of electrocardiograms
  and isochrones from intracavitary probe potentials.
\newblock {\em J. Cardiovasc. Electrophysiol.}, 8:415--431, 1997.

\bibitem{RSM:Mac95e}
R.S. MacLeod, B.~Taccardi, and R.L. Lux.
\newblock Mapping of cardiac ischemia in a realistic torso tank preparation.
\newblock In {\em Building Bridges: International Congress on Electrocardiology
  International Meeting}, pages 76--77, 1995.

\bibitem{RSM:Mac96}
R.S. MacLeod, R.L. Lux, M.S. Fuller, and B.~Taccardi.
\newblock Evaluation of novel measurement methods for detecting heterogeneous
  repolarization.
\newblock {\em J. Electrocardiol.}, 29 Suppl.:145--153, 1996.

\bibitem{RSM:Mac97}
R.S. MacLeod, R.L. Lux, and B.~Taccardi.
\newblock A possible mechanism for electrocardiographically silent changes in
  cardiac repolarization.
\newblock {\em J. Electrocardiol.}, 30 Suppl.:114--121, 1997.

\bibitem{RSM:Mac98}
R.S. MacLeod and D.H. Brooks.
\newblock Recent progress in inverse problems in electrocardiology.
\newblock {\em IEEE Eng. in Med. \& Biol. Soc. Magazine}, 17(1):73--83, January
  1998.

\bibitem{RSM:Oos97}
T.~Oostendorp, R.S. Macleod, and A.~van Oosterom.
\newblock Non-invasive determination of the activation sequence of the heart:
  {V}alidation with invasive data.
\newblock In {\em Proceedings of the IEEE Engineering in Medicine and Biology
  Society 19th Annual International Conference}. IEEE, 1997.

\bibitem{RSM:Spo80}
C.W. Spoor and F.E. Veldpaus.
\newblock Rigid body motion calculated from spatial co-ordinates of markers.
\newblock {\em J. Biomech.}, 13:391--393, 1980.

\bibitem{RSM:Cha95}
J.H. Challis.
\newblock A procedure for determining rigid body transformation parameters.
\newblock {\em J. Biomechanics}, 28(6):733--737, 1995.

\bibitem{RSM:Get86}
L.S. Gettes.
\newblock Effects of ischemia on cardiac electrophysiolgy.
\newblock In {Fozzard, H.E. {\em et al.}}, editor, {\em The Heart and
  Cardiovascular System}, pages 1317--1341. Raven Press, New York, 1986.

\bibitem{RSM:Pfl90}
P.W. Pflugfelder.
\newblock Magnetic resonance imaging of the cardiovascular system: {P}otential
  applications.
\newblock {\em Medicine North America}, pages 410--418, February 1990.

\bibitem{RSM:Pur88}
C.J. Purcell, G.~Stroink, and B.M. Hor\'{a}\v{c}ek.
\newblock Effect of torso boundaries on electrical potential and magnetic field
  of a dipole.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-35:671--678, September 1988.

\bibitem{RSM:Hre95}
R.~Hren and G.~Stroink.
\newblock Application of the surface harmonic expansions for modeling the human
  torso.
\newblock {\em IEEE Trans Biomed. Eng.}, 42(5):521, 1995.

\bibitem{RSM:Bra97}
C.P. Bradley, A.J. Pullan, and P.J. Hunter.
\newblock Geometric modeling of the human torso using cubic hermite elements.
\newblock {\em Annal. Biomed. Eng.}, 25:96--111, 1997.

\bibitem{RSM:Hin97}
K.P. Hinshaw and J.F. Brinkley.
\newblock Using 3-{D} shape models to guide segmentation of {MR} brain images.
\newblock In {\em Proc. AMIA Ann. Fall Symp.}, 1997.

\bibitem{RSM:Cal98}
E.~Calabi, P.J. Olver, C.~Shakiban, A.~Tannenbaum, and S.~Haker.
\newblock Differential and numerically invariant signature curves applied to
  object recognition.
\newblock {\em Int. J. Comp. Vision}, 26(2):107, 1998.

\bibitem{RSM:Oos78}
A.~van Oosterom.
\newblock Triangulating the human torso.
\newblock {\em Computer J.}, 21:253--258, 1978.

\bibitem{RSM:Cla88}
F.J. Claydon, T.C. Pilkington, A.S.L. Tang, M.N. Morrow, and R.E. Ideker.
\newblock A volume conductor model of the thorax for the study of
  defibrillation fields.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-35:981--992, 1988.

\bibitem{RSM:Mer90}
R.R. Mercer, G.M. McCauley, and S.~Anjilvel.
\newblock Approximation of surfaces in a quantitative {3-D} reconstruction
  system.
\newblock {\em IEEE Trans Biomed. Eng.}, BME-37:1136--1146, 1990.

\bibitem{RSM:Mac92c}
R.S. MacLeod, C.R. Johnson, and M.A. Matheson.
\newblock Visualization tools for computational electrocardiography.
\newblock In {\em Visualization in Biomedical Computing}, pages 433--444,
  Bellingham, Wash., 1992. Proceedings of the SPIE \#1808.

\bibitem{RSM:Sui90}
W.~Sui and F.~Shen.
\newblock Computer model of an inhomogeneous human torso.
\newblock {\em J. Biomed. Eng}, 12:124--128, 1990.

\bibitem{RSM:Sha90}
A.~Vahid Shahidi and P.R. Savard.
\newblock A volume conductor model of the human thorax for field calculations.
\newblock In {\em Proceedings of the IEEE Engineering in Medicine and Biology
  Society 12th Annual International Conference}, pages 615--616. IEEE Press,
  1990.

\bibitem{RSM:Mac91}
R.S. MacLeod, C.R. Johnson, and P.R. Ershler.
\newblock Construction of an inhomogeneous model of the human torso for use in
  computational electrocardiography.
\newblock In {\em Proceedings of the IEEE Engineering in Medicine and Biology
  Society 13th Annual International Conference}, pages 688--689. IEEE Press,
  1991.

\bibitem{RSM:Joh91b}
C.R. Johnson and R.S. MacLeod.
\newblock Computer models for calculating transthoracic current flow.
\newblock In {\em Proceedings of the IEEE Engineering in Medicine and Biology
  Society 13th Annual International Conference}, pages 768--769. IEEE Press,
  1991.

\bibitem{RSM:Joh92}
C.R. Johnson, R.S. MacLeod, and P.R. Ershler.
\newblock A computer model for the study of electrical current flow in the
  human thorax.
\newblock {\em Comp. in Biol. \& Med.}, 22:305--323, 1992.

\bibitem{RSM:Bud93}
D.M. Budgett, D.M. Monro, S.W. Edwards, and R.D. Stanbridge.
\newblock Comparison of measured and computed epicardial potentials from a
  patient-specific inverse model.
\newblock {\em J. Electrocardiol.}, 26 Suppl:165--73, 1993.

\bibitem{RSM:Mon86e}
D.M. Monro, P.J. Bones, R.~de~Stanbridge, and R.W. Jones.
\newblock Comparison of epicardial and body surface {ECG} potentials in man.
\newblock {\em Cardiovasc. Res.}, 20:201--207, 1986.

\bibitem{RSM:Spa77}
M.S. Spach, R.C. Barr, C.F. Lanning, and P.C. Tucek.
\newblock Origin of body surface {QRS} and {T}-wave potentials from epicardial
  potential distributions in the intact chimpanzee.
\newblock {\em Circ.}, 55:268--278, 1977.

\bibitem{RSM:Spa78b}
M.S. Spach, R.C. Barr, and C.F. Lanning.
\newblock Experimental basis for {QRS} and {T}-wave potential in the {WPW}
  syndrome.
\newblock {\em Circ. Res.}, 42:103--118, 1978.

\bibitem{RSM:Kil89}
D.~Kilpatrick, A.J. Bell, and S.J. Walker.
\newblock Derived epicardial potentials differentiate ischemic {ST} depression
  from {ST} depression secondary to {ST} elevation in acute inferior myocardial
  infarction in humans.
\newblock {\em J. Am. Coll. Cardiol.}, 14(3):695--702, 1989.

\bibitem{RSM:Yee95}
R.~Yee, G.~J. Klein, and G.~M. Guiraudon.
\newblock The {W}olff-{P}arkinson-{W}hite syndrome.
\newblock In D.P. Zipes and J.~Jalife, editors, {\em Cardiac Electrophysiology,
  From Cell to Bedside}, pages 1199--1214. W.B. Saunders Co., 1995.

\bibitem{RSM:Lux89}
R.L. Lux, P.R. Ershler, K.P. Anderson, and J.W. Mason.
\newblock Rapid localization of accessory pathways in {WPW} syndrome using
  unipolar potential mapping.
\newblock In {\em Proceedings of the IEEE Engineering in Medicine and Biology
  Society 11th Annual International Conference}, pages 195--196. IEEE Press,
  1989.

\bibitem{RSM:Jac88}
W.M. Jackman, K.J. Friday, Yeung-Lai-Wah, D.M. Fitzgerald, B.~Beck, A.J.
  Bowman, P.~Stelzer, L.~Harrison, and R.~Lazzara.
\newblock New catheter technique for recording left free-wall accessory
  atrioventicular pathway activation identification of pathway fiber
  orientation.
\newblock {\em Circ.}, 78:598--610, 1988.

\bibitem{RSM:Pen95}
C.J. Penney, J.C. Clements, M.J. Gardner, L.~Sterns, and B.M. Hor\'{a}\v{c}ek.
\newblock The inverse problem of electrocardiography: {A}pplication to
  localization of {W}olff-{P}arkinson-{W}hite pre-excitation sites.
\newblock In {\em Proceedings of the IEEE Engineering in Medicine and Biology
  Society 17th Annual International Conference}, pages 215--216. IEEE Press,
  1995.

\bibitem{RSM:Gru79}
A.R. Gr{\"u}ntzig, A.~Senning, and W.E. Siegenthaler.
\newblock Nonoperative dilatation of coronary artery stenosis.
\newblock {\em New Eng. J. Med.}, 301:61--68, 1979.

\bibitem{RSM:Ser86e}
P.W. Serruys and G.T. Meester, editors.
\newblock {\em Coronary Angioplasty: {A} Controlled Model for Ischemia}.
\newblock Martinus Nijhoff Publishers, Dordrecht/Boston/Lancaster, 1986.

\bibitem{RSM:Ser84}
P.W. Serruys, W.~Wijns, M.~van~den Brand, S.~Meu, C.~Slager, J.C.H.
  Schuurbiers, P.G. Hugenholtz, and R.W. Brower.
\newblock Left ventricular performance, regional blood flow, wall motion, and
  lactate metabolism during transluminal angioplasty.
\newblock {\em Circ.}, 70:25--36, 1984.

\bibitem{RSM:Dis86}
A.~Distante, E.~Picano, and A.~L'Abbate.
\newblock Wall thickening and motion in transient myocardial ischemia:
  Similarities and discrepancies between different models of ischemia in man
  ({P}rinzmetal's angina, coronary angioplasty, dipyridamole test).
\newblock In P.W. Serruys and G.T. Meester, editors, {\em Coronary Angioplasty:
  {A} Controlled Model for Ischemia}, pages 55--60. Martinus Nijhoff
  Publishers, Dordrecht/Boston/Lancaster, 1986.

\bibitem{RSM:Erb86}
R.~Erbel, B.~Henkel, G.~Scheiner, W.~Clas, R.~Brennecke, H.~Kopp, and J.~Meyer.
\newblock Clinical, electrocardiographic and hemodynamic changes during
  coronary angioplasty. influence of nitroglycerine and nifedipine.
\newblock In P.W. Serruys and G.T. Meester, editors, {\em Coronary Angioplasty:
  {A} Controlled Model for Ischemia}, pages 39--52. Martinus Nijhoff
  Publishers, Dordrecht/Boston/Lancaster, 1986.

\bibitem{RSM:Coh86}
M.~Cohen and K.P. Rentrop.
\newblock Assessment of the dynamic and functional characteristics of
  collateral flow observed during sudden controlled coronary artery occlusion.
\newblock In P.W. Serruys and G.T. Meester, editors, {\em Coronary Angioplasty:
  {A} Controlled Model for Ischemia}, pages 115--131. Martinus Nijhoff
  Publishers, Dordrecht/Boston/Lancaster, 1986.

\bibitem{RSM:Grb86}
M.~Grbic and U.~Sigwart.
\newblock Left ventricular filling during acute ischemia.
\newblock In P.W. Serruys and G.T. Meester, editors, {\em Coronary Angioplasty:
  {A} Controlled Model for Ischemia}, pages 141--148. Martinus Nijhoff
  Publishers, Dordrecht/Boston/Lancaster, 1986.

\bibitem{RSM:Poo86}
P.A. Poole-Wilson and S.C. Webb.
\newblock Role of potassium in the genesis of arrhythmias during ischemia.
  evidence from coronary angioplasty.
\newblock In P.W. Serruys and G.T. Meester, editors, {\em Coronary Angioplasty:
  {A} Controlled Model for Ischemia}, pages 95--100. Martinus Nijhoff
  Publishers, Dordrecht/Boston/Lancaster, 1986.

\bibitem{RSM:Rit72}
H.J.~Ritsema van Eck.
\newblock {\em Digital Computer Simulation of Cardiac Excitation and
  Repolarization in Man}.
\newblock PhD thesis, Dalhousie University, Halifax, N.S., 1972.

\bibitem{RSM:Mac73}
E.~Macchi.
\newblock {\em Digital Computer Simulation of the Atrial Electrical Excitation
  Cycle in Man}.
\newblock PhD thesis, Dalhousie University, Halifax, N.S., 1973.

\bibitem{RSM:Hor73}
B.M. Hor\'{a}\v{c}ek.
\newblock Digital model for studies in magnetocardiography.
\newblock {\em IEEE Trans. Mag.}, MAG-9:440--444, 1973.

\bibitem{RSM:Hor74}
B.M. Hor\'{a}\v{c}ek.
\newblock Numerical model of an inhomogensous human torso.
\newblock {\em Adv. Cardiol.}, 10:51--57, 1974.

\bibitem{RSM:Til99}
B.~Tilg, P.~Wach, A.~Sippensgroenewegen, G.~Fischer, R.~Modre, F.~Roithinger,
  M.~Mlynash, G.~Reddy, T.~Roberts, M.~Lesh, and P.~Steiner.
\newblock Closed chest validation of source imaging from human ecg and mcr
  mapping.
\newblock In {\em Proceedings of The First JointBMES/EMBS Conference}, page
  275. IEEE Press, 1999.

\bibitem{RSM:Sme98}
J.~Smeets, S.~Ben Haim, L.~Rodriguez, C.~Timmermans, and H.~Wellens.
\newblock New method for nonfluoroscopic endocardial mapping in humans.
\newblock {\em Circ.}, 97:2426--2432, 1998.

\bibitem{RSM:Kho95}
D.S. Khoury, B.~Taccardi, R.L. Lux, P.R. Ershler, and Y.~Rudy.
\newblock Reconstruction of endocardial potentials and activation sequences
  from intracavity probe measurements.
\newblock {\em Circ.}, 91:845--863, 1995.

\bibitem{RSM:Kho98}
D.S. Khoury, K.L. Berrier, S.M. Badruddin, and W.A. Zoghbi.
\newblock Three-dimensional electrophysiological imaging of the intact canine
  left ventricle using a noncontact multielectrode cavitary probe: study of
  sinus, paced, and spontaneous premature beats.
\newblock {\em Circ.}, 97(4):399--409, 1998.

\end{thebibliography}
