% Filename: Acknowledgements
% Last update: Sat Apr 1 2015 by Brett Burton
%    - created
%   
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\section{Acknowledgements}
\label{sec:acknowl}

Imaging and electroencephalography for this project were done at
Electrical Geodesics Inc. at the University of Oregon.  This project
was supported by the National Institute of General Medical Sciences of
the National Institutes of Health under grant number P41 GM103545-18.
